<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">NAME HBF2GF WINDOWCOMPAT
DESCRIPTION 'hbf2gf (CJK Ver. 4.8.5)'
STACKSIZE 0x80000
</pre></body></html>